From eaa657fe96dbc41d5acaa07425ff4584fae297bb Mon Sep 17 00:00:00 2001
From: Eduardo Chappa <chappa@washington.edu>
Date: Fri, 7 Aug 2015 17:43:12 -0600
Subject:    * LibreSSL 2.2.2 does not have RAND_egd, so we eliminate that call
 (we were      not using it anyway.)

---
 pith/pine.hlp | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'pith/pine.hlp')

diff --git a/pith/pine.hlp b/pith/pine.hlp
index 4bfd173b..acd3863b 100644
--- a/pith/pine.hlp
+++ b/pith/pine.hlp
@@ -140,7 +140,7 @@ with help text for the config screen and the composer that didn't have any
 reasonable place to be called from.
 Dummy change to get revision in pine.hlp
 ============= h_revision =================
-Alpine Commit 87 2015-08-04 00:44:43
+Alpine Commit 88 2015-08-07 17:43:07
 ============= h_news =================
 <HTML>
 <HEAD>
-- 
cgit v1.2.3-70-g09d2

