From bc15b12b7f13ec9c9cd855aae0e62be4d0ef9e31 Mon Sep 17 00:00:00 2001
From: Eduardo Chappa <chappa@washington.edu>
Date: Tue, 23 Nov 2021 10:53:59 -0700
Subject:    * In some systems the size of a directory is the sum of the sizes
 of      all files contained in it, so sbuf.st_size might be too large and the
      malloc() might fail with error ENOMEM. Since this is just the list of   
   files, and not the contents of the files, let us start with a small     
 amount and resize when necessary. Reported by Sebasting Knust.

---
 pith/pine.hlp | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'pith/pine.hlp')

diff --git a/pith/pine.hlp b/pith/pine.hlp
index cc8c8f55..e9fee1cd 100644
--- a/pith/pine.hlp
+++ b/pith/pine.hlp
@@ -140,7 +140,7 @@ with help text for the config screen and the composer that didn't have any
 reasonable place to be called from.
 Dummy change to get revision in pine.hlp
 ============= h_revision =================
-Alpine Commit 621 2021-11-22 18:19:28
+Alpine Commit 622 2021-11-23 10:53:56
 ============= h_news =================
 <HTML>
 <HEAD>
-- 
cgit v1.2.3-54-g00ecf

