From 90d819144d14e3ca375ead5aa2c3b3158248780a Mon Sep 17 00:00:00 2001
From: Eduardo Chappa <chappa@washington.edu>
Date: Sat, 4 Dec 2021 13:19:53 -0700
Subject:    * Only "Authorize" and "Device" are values accepted for the flow
 during      initial authentication using XOAUTH2. A warning message (and
 error)      will be seen by the user in case the user attempts a different
 flow.

---
 pith/pine.hlp | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'pith/pine.hlp')

diff --git a/pith/pine.hlp b/pith/pine.hlp
index 94cc9da3..bacd3413 100644
--- a/pith/pine.hlp
+++ b/pith/pine.hlp
@@ -140,7 +140,7 @@ with help text for the config screen and the composer that didn't have any
 reasonable place to be called from.
 Dummy change to get revision in pine.hlp
 ============= h_revision =================
-Alpine Commit 629 2021-12-03 21:20:33
+Alpine Commit 630 2021-12-04 13:19:50
 ============= h_news =================
 <HTML>
 <HEAD>
-- 
cgit v1.2.3-54-g00ecf

