From 8a8766c0b2117dbf64655ec62331319077c1b803 Mon Sep 17 00:00:00 2001
From: Eduardo Chappa <chappa@washington.edu>
Date: Mon, 3 Jun 2019 11:14:11 -0600
Subject:    * Return some code used to sign messages. Apparently openssl is
 not      consistent in what it signs. Problem reported by Björn Krellner.
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

---
 pith/pine.hlp | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'pith/pine.hlp')

diff --git a/pith/pine.hlp b/pith/pine.hlp
index de38e614..51d0d003 100644
--- a/pith/pine.hlp
+++ b/pith/pine.hlp
@@ -140,7 +140,7 @@ with help text for the config screen and the composer that didn't have any
 reasonable place to be called from.
 Dummy change to get revision in pine.hlp
 ============= h_revision =================
-Alpine Commit 344 2019-05-25 17:53:29
+Alpine Commit 346 2019-06-03 11:10:47
 ============= h_news =================
 <HTML>
 <HEAD>
-- 
cgit v1.2.3-54-g00ecf

