From 69b0d3a5dff7b8be0deada358dad1a55f319d769 Mon Sep 17 00:00:00 2001
From: Eduardo Chappa <chappa@washington.edu>
Date: Fri, 17 Apr 2015 09:40:29 -0600
Subject: NOTICE NOTICE NOTICE NOTICE NOTICE NOTICE NOTICE NOTICE NOTICE NOTICE
 NOTICE

   * Call to utf8_parameters was not prototyped.

   * Call to utf8_parameters did not return NULL when the value to be
     searched was not defined by that function, causing a crash. Reported
     and fixed by Dennis Davis.
---
 pith/pine.hlp | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'pith/pine.hlp')

diff --git a/pith/pine.hlp b/pith/pine.hlp
index 4f57b688..10f4473b 100644
--- a/pith/pine.hlp
+++ b/pith/pine.hlp
@@ -140,7 +140,7 @@ with help text for the config screen and the composer that didn't have any
 reasonable place to be called from.
 Dummy change to get revision in pine.hlp
 ============= h_revision =================
-Alpine Commit 73 2015-04-03 17:07:19
+Alpine Commit 75 2015-04-17 09:40:25
 ============= h_news =================
 <HTML>
 <HEAD>
-- 
cgit v1.2.3-54-g00ecf

