From 4399d536cf37ec3e98a872980020647f2bcb6500 Mon Sep 17 00:00:00 2001
From: Eduardo Chappa <chappa@washington.edu>
Date: Fri, 22 Sep 2017 17:01:36 -0600
Subject:    * configure script and add check for HAVE_WCWIDTH by Stefan
 Haubenth.

---
 pith/pine.hlp | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'pith/pine.hlp')

diff --git a/pith/pine.hlp b/pith/pine.hlp
index 273571d0..52b7dffa 100644
--- a/pith/pine.hlp
+++ b/pith/pine.hlp
@@ -140,7 +140,7 @@ with help text for the config screen and the composer that didn't have any
 reasonable place to be called from.
 Dummy change to get revision in pine.hlp
 ============= h_revision =================
-Alpine Commit 216 2017-09-19 21:56:28
+Alpine Commit 217 2017-09-22 17:01:27
 ============= h_news =================
 <HTML>
 <HEAD>
-- 
cgit v1.2.3-54-g00ecf

