From 3463dc142b787d8010cf9310caa7915f30a9e275 Mon Sep 17 00:00:00 2001
From: Eduardo Chappa <chappa@washington.edu>
Date: Thu, 18 Jul 2013 20:58:04 -0600
Subject:   * Extended support for recognition of UTF-8 in urls, according to
 information     from http://url.spec.whatwg.org

---
 pith/pine.hlp | 4 +++-
 1 file changed, 3 insertions(+), 1 deletion(-)

(limited to 'pith/pine.hlp')

diff --git a/pith/pine.hlp b/pith/pine.hlp
index cf5039b1..7f7a1334 100644
--- a/pith/pine.hlp
+++ b/pith/pine.hlp
@@ -140,7 +140,7 @@ with help text for the config screen and the composer that didn't have any
 reasonable place to be called from.
 Dummy change to get revision in pine.hlp
 ============= h_revision =================
-Alpine Commit 17 2013-07-15 14:35:02
+Alpine Commit 18 2013-07-18 20:57:53
 ============= h_news =================
 <HTML>
 <HEAD>
@@ -184,6 +184,8 @@ Additions include:
 with a quote string, followed by a space were considered individual paragraphs,
 now they are considered part of a paragraph. Based on earlier joint work
 with Jeff Franklin.
+   <LI> Extended support of recognition of UTF-8 in urls based on information from
+http://url.spec.whatwg.org.
    <LI> Add ability to <A HREF="h_config_folder_color">color folder names</A>, 
  <A HREF="h_config_directory_color">directory names</A>,
  and <A HREF="h_config_folder_list_color">text</A> in the FOLDER SCREEN.
-- 
cgit v1.2.3-54-g00ecf

