From 0d181b64d4d433a5ec88c4bfd55cd5a1d5f9a1da Mon Sep 17 00:00:00 2001
From: Eduardo Chappa <chappa@washington.edu>
Date: Tue, 28 Jul 2020 20:52:28 -0600
Subject:   * XOAUTH2: automatic renew of access token and connection to a
 server     within 60 seconds of expiration of the access token.

---
 pith/pine.hlp | 5 ++++-
 1 file changed, 4 insertions(+), 1 deletion(-)

(limited to 'pith/pine.hlp')

diff --git a/pith/pine.hlp b/pith/pine.hlp
index 428792b5..e215ec9b 100644
--- a/pith/pine.hlp
+++ b/pith/pine.hlp
@@ -140,7 +140,7 @@ with help text for the config screen and the composer that didn't have any
 reasonable place to be called from.
 Dummy change to get revision in pine.hlp
 ============= h_revision =================
-Alpine Commit 496 2020-07-19 02:52:27
+Alpine Commit 498 2020-07-28 20:52:25
 ============= h_news =================
 <HTML>
 <HEAD>
@@ -194,6 +194,9 @@ problems you find with this release.
 <LI> Expansion of the configuration screen for XOAUTH2 to include
      username, authorization flow, and tenant.
 
+<LI> XOAUTH2: automatic renew of access token and connection to a server
+     within 60 seconds of expiration of the access token.
+
 <LI> If a user has more than one client-id for a service, Alpine tries to
      asks the user which client-id to use and associates that client-id to
      the credentials in the XOAUTH2 configuration screen.
-- 
cgit v1.2.3-54-g00ecf

